X-Git-Url: https://scm.cri.minesparis.psl.eu/git/Faustine.git/blobdiff_plain/e775f23a10c4ba37fc1a762299f52cd0d71593b7..f1f94803668061f90a5ce88bf06ee72bba8e41a5:/interpretor/lib/src/libsndfile-1.0.25/tests/utils.def?ds=inline

diff --git a/interpretor/lib/src/libsndfile-1.0.25/tests/utils.def b/interpretor/lib/src/libsndfile-1.0.25/tests/utils.def
new file mode 100644
index 0000000..0d94183
--- /dev/null
+++ b/interpretor/lib/src/libsndfile-1.0.25/tests/utils.def
@@ -0,0 +1,52 @@
+autogen definitions utils.tpl;
+
+float_type = {
+	name = float ;
+	};
+
+float_type = {
+	name = double ;
+	};
+
+/*----------------------------------*/
+
+io_type = {
+	io_element	= short ;
+	format_str		= "\"% d\"" ;
+	};
+
+io_type = {
+	io_element	= int ;
+	format_str		= "\"% d\"" ;
+	};
+
+io_type = {
+	io_element	= float ;
+	format_str		= "\"% g\"" ;
+	};
+
+io_type = {
+	io_element 	= double ;
+	format_str		= "\"% g\"" ;
+	};
+
+read_op = {
+	op_element	= read ;
+	count_name	= items ;
+	};
+
+read_op = {
+	op_element	= readf ;
+	count_name	= frames ;
+	};
+
+write_op = {
+	op_element	= write ;
+	count_name	= items ;
+	};
+
+write_op = {
+	op_element	= writef ;
+	count_name	= frames ;
+	};
+
