X-Git-Url: https://scm.cri.minesparis.psl.eu/git/Faustine.git/blobdiff_plain/e5b0e8bee502e61dfaaf2a5bc4b4d9d4938a9a2a..e775f23a10c4ba37fc1a762299f52cd0d71593b7:/interpretor/libsndfile-1.0.25/src/test_endswap.def

diff --git a/interpretor/libsndfile-1.0.25/src/test_endswap.def b/interpretor/libsndfile-1.0.25/src/test_endswap.def
new file mode 100644
index 0000000..c817322
--- /dev/null
+++ b/interpretor/libsndfile-1.0.25/src/test_endswap.def
@@ -0,0 +1,20 @@
+autogen definitions test_endswap.tpl;
+
+int_type = {
+	name		= short ;
+	value		= 0x3210 ;
+	format		= FMT_SHORT ;
+	} ;
+
+int_type = {
+	name		= int ;
+	value		= 0x76543210 ;
+	format		= FMT_INT ;
+	} ;
+
+int_type = {
+	name		= int64_t ;
+	value		= "0x0807050540302010LL" ;
+	format		= FMT_INT64 ;
+	} ;
+
